S3伽玛帮助

要学习如何使用帮助，请按 F1键。   版权


栓槽显示 是红、绿、和蓝色伽玛栓槽被显示出来的地方。这些是会大概显示出伽玛将会如何被调整的曲线。一般而言，从一个角到另一个角的直线表示1.00的伽玛，或不需调整。超过45度的弯曲曲线表示伽玛已经被调整过，所以（栓槽的）的颜色会比正常的颜色更亮。45度线以下的弯曲表示被调整的颜色会比一般的颜色暗。


移动红色的滑杆来调整红色组件的伽玛值。越往右边移动此调整器，伽玛值就越高，红色就会越亮。越往左边移动此调整器，伽玛值就越低，红色就会越暗。


要更改红色组件的伽玛调整值，您可以在这个区域输入0.20到3.00的值。值越高，红色就会越亮，值越低，红色就会越暗。


移动绿色的滑杆来调整绿色组件的伽玛值。越往右边移动此调整器，伽玛值就越高，绿色就会越亮。越往左边移动此调整器，伽玛值就越低，绿色就会越暗。


要更改绿色组件的伽玛调整值，您可以在这个区域输入0.20到3.00的值。值越高，绿色就会越亮，值越低，绿色就会越暗。


移动蓝色的滑杆来调整蓝色组件的伽玛值。越往右边移动此调整器，伽玛值就越高，蓝色就会越亮。越往左边移动此调整器，伽玛值就越低，蓝色就会越暗。


要更改蓝色组件的伽玛调整值，您可以在这个区域输入0.20到3.00的值。值越高，蓝色就会越亮，值越低，蓝色就会越暗。


这个复选框决定红、绿、和蓝色伽玛调整值是否互相链接在一起。如果这个框被选取，伽玛组件便是链接在一起，表示这三个伽玛值永远都会是一样的。如果这个框没有被选取，那么每个伽玛调整值便可以被个别更改。


这个按钮可以保存所有达1.00的伽玛调整值，并在「已链接」复选框放置一个选取记号。这是缺省值，在这里，没有任何伽玛调整值被套用到您的录像输出。


按一下这里来保存您的当前伽玛设置值。您所输入的名称会出现在设计方案清单，所以您可以很容易地选择此名称来还原您的设置值。


删除「设计方案」框中选取的设计方案。


S3 伽玛是可以让您从S3图形芯片调整输出 伽玛 的实用程序。简单而言，调整伽玛就等于是调整亮度。


列出您可以用来更改已套用于您系统中的伽玛调整值的设计方案。设计方案可以保存红、绿、和蓝色、以及三个组件是否链接在一起的伽玛调整值。


提供一个您可以键入当前伽玛设置值的地方。您所键入的名称会出现「设计方案」清单，因此，稍后您可以很容易地还原这三个设置值。


版权注明

S3, S3 On Board, 和 Trio3D 是 S3 公司的商标。