คำอธิบายโปรแกรมแสดงผลทางโทรทัศน์ S3


อุปกรณ์แสดงผล: แสดงและเลือกอุปกรณ์แสดงผลที่ต้องการใช้งาน อุปกรณ์แสดงผลที่สามารถเลือกใช้ได้คือ จอ CRT, โทรทัศน์ หรือทั้งสองแบบ


CRT: เลือกเพื่อแสดงผลบนจอ CRT


โทรทัศน์: เลือกเพื่อแสดงผลบนโทรทัศน์


CRT Bitmap: แสดงสถานะของจอ CRT ถ้าไม่ได้ต่อจอ CRT ไว้ บิตแมพของจอ CRT จะแสดงเป็นจอว่าง ถ้าต่อจอ CRT ไว้แต่ไม่ได้เลือกให้แสดงผล บิตแมพของจอ CRT จะแสดงเป็นจอว่าง ถ้าต่อจอ CRT และเลือกให้แสดงผลไว้ จะแสดงเป็นภาพของเดสค์ทอป


TV Bitmap: แสดงสถานะของโทรทัศน์ ถ้าไม่ได้ต่อโทรทัศน์ไว้ บิตแมพของโทรทัศน์จะแสดงเป็นจอว่าง ถ้าต่อโทรทัศน์ไว้แต่ไม่ได้เลือกให้แสดงผล บิตแมพของโทรทัศน์จะแสดงเป็นจอว่าง ถ้าต่อโทรทัศน์ไว้และเลือกให้แสดงผล จะแสดงเป็นภาพของเดสค์ทอป ถ้าความละเอียดปัจจุบันไม่สนับสนุนการแสดงผลบนจอโทรทัศน์ จอบิตแมพของโทรทัศน์จะว่าง และบิตแมพจะถูกวาดด้วยวงกลมสีแดงและมีขีดทับ


ใช้ข้อมูล DDC ของจอ CRT: ถ้าเลือกตัวเลือกนี้และ ต่อจอ CRT แบบ DDCไว้ หน้าจอ Display Properties Settings(กำหนดคุณสมบัติการแสดงผล) จะแสดงเฉพาะโหมดและอัตราการรีเฟรชที่ จอ CRT แบบ DDC ของท่านสนับสนุน ถ้าไม่ได้เลือกตัวเลือกนี้ไว้ รายการที่แสดงจะแสดงโดยไม่มีข้อจำกัด ดังนั้นท่านควรจะระมัดระวังโดยใช้คำสั่ง “Test(ทดสอบ)” เพื่อดูว่าจอภาพของท่านสนับสนุนโหมดหรืออัตราการรีเฟรชใหม่หรือไม่ก่อนที่จะเลือก “Apply(ทำงาน)” หรือ “OK(ตกลง)” เพื่อยอมรับค่าที่กำหนดใหม่


กำหนดการทำงานเพิ่มเติม: คลิกที่นี่เพื่อเปิดกรอบกำหนดการทำงานเพิ่มเติม


ค่าที่กำหนดไว้ของโทรทัศน์: แสดงถึงมาตรฐานของโทรทัศน์และชนิดสัญญาณที่ออกมาของจอโทรทัศน์ที่ต่อไว้ในขณะนั้น


ชนิดของโทรทัศน์: แสดงชนิดของโทรทัศน์ที่ต่อไว้ (NTSC, PAL หรือ NTSC ของญี่ปุ่น)


สัญญาณออกของโทรทัศน์:  แสดงชนิดของสัญญาณออกที่ส่งไปยังโทรทัศน์ที่ต่อไว้(Composite Video หรือ S-Video)


ควบคุมโทรทัศน์: ใช้ปรับความสว่าง คอนทราสต์ สี และ สีพื้น


ควบคุมความสว่าง: ใช้ปรับความสว่างจากความสว่างต่ำสุดถึงสูงสุดโดยใช้ตัวเลื่อน


ควบคุมคอนทราสต์: ใช้ปรับคอนทราสต์จากต่ำสุดถึงสูงสุดโดยใช้ตัวเลื่อน


ควบคุมสี: ใช้ปรับสีของโทรทัศน์จากสีน้อยสุดถึงมากสุดโดยใช้ตัวเลื่อน


ควบคุมสีพื้น: ใช้ปรับสีพื้นของโทรทัศน์จากสีเขียวถึงม่วงโดยใช้ตัวเลื่อน


ปุ่มกำหนดค่าเริ่มต้น: คลิกปุ่มนี้เพื่อกำหนด ความสว่าง คอนทราสต์ สีและสีพื้น ให้เป็นไปตามค่าเริ่มต้นที่เก็บไว้บน BIOS


ตัวกรองการสั่น: แสดงสถานะของตัวกรองการสั่นของโทรทัศน์ การกรองตัวสั่นจะเพิ่มคุณภาพของกราฟฟิคที่แสดงบนโทรทัศน์


ตัวเลื่อนตัวกรองการสั่น:  เพิ่มหรือลดปริมาณของตัวกรองการสั่นที่ระบบใช้งานจากค่าต่ำสุดไปถึงค่ามากสุด


ตัวเลื่อนตัวกรองการสั่น: เพิ่มหรือลดปริมาณของตัวกรองการสั่นที่ระบบใช้งานจากปริมาณต่ำสุด (หมายถึงปิดตัวกรองการสั่น) ถึงปริมาณสูงสุด


 ความคมชัด: เพิ่มประสิทธิภาพในการควบคุมคอนทราสต์ของขอบทั้งหมดโดยเทียบกับค่าที่กำหนดไว้ของตัวกรองการสั่น


ตัวเลื่อนความคมชัด: เพิ่มหรือลดปริมาณของความคมชัดที่ระบบใช้ จากค่าต่ำสุดถึงค่าสูงสุด


บิทแมพการปรับโทรทัศน์:  แสดงให้เห็นถึงขนาดของโทรทัศน์ และตำแหน่งที่จะแสดงให้เห็นบนจอภาพโทรทัศน์ตามค่าที่กำหนดไว้ปัจจุบัน


รูปแบบการทดสอบ: คลิกเพื่อเริ่มวงจรทดสอบเพื่อปรับค่าที่กำหนดไว้สำหรับการส่งสัญญาณเพื่อแสดงผลบนจอโทรทัศน์


ขนาดแนวนอน/แนวตั้ง: ปรับความกว้างและความสูงของภาพที่แสดงบนจอโทรทัศน์


ปุ่มปรับขนาดแนวนอน/แนวตั้ง: ลูกศรซ้ายและขวาจะใช้สำหรับเพิ่มหรือลดขนาดในแนวนอนเพื่อกำหนดภาพให้แคบลงหรือกว้างขึ้น ลูกศรขึ้นและลงจะใช้สำหรับเพิ่มหรือลดขนาดแนวตั้งเพื่อกำหนดภาพให้สั้นลงหรือยาวขึ้น คลิกปุ่มกลางเพื่อกำหนดขนาดแนวนอนและแนวตั้งของภาพบนโทรทัศน์ให้เป็นไปตามค่าที่กำหนดไว้ใน BIOS


ตำแหน่งโทรทัศน์:  ปรับตำแหน่งของภาพที่แสดงบนจอโทรทัศน์


ปุ่มปรับตำแหน่งโทรทัศน์: คลิกลูกศรเพื่อเลื่อนตำแหน่งของภาพที่แสดงบนจอโทรทัศน์ตามทิศทางของปุ่มที่กด คลิกปุ่มกลางเพื่อกำหนดตำแหน่งให้เป็นค่าเริ่มต้น


ล็อคตามอัตราส่วน:  เลือกตัวเลือกนี้ เพื่อล็อคพื้นที่การแสดงบนโทรทัศน์ให้เป็นอัตราส่วน 4:3 และเมื่อเลือกตัวเลือกนี้ จะสามารถปรับได้เฉพาะขนาดในแนวตั้งเท่านั้น


ปุ่มกำหนด Aperture Correction:  คลิกเพื่อเรียกกรอบโต้ตอบสำหรับกำหนดการควบคุม Aperture Correction  ของโทรทัศน์


ปุ่มกำหนดค่าเริ่มต้น: คลิกเพื่อกำหนดค่าของตัวกรองการสั่น ช่วงในการสอดแทรก(Interpolative Threshold) ขนาดแนวนอน ขนาดแนวตั้ง และล็อคอัตราส่วนให้เป็นไปตามค่าเริ่มต้นที่อยู่ใน BIOS


Inverse Aperture Correction:  เมื่อไม่ได้เลือกตัวเลือกนี้ Aperture Correction จะกำหนดไว้เพื่อปรับปรุงกราฟฟิค และข้อความของวินโดว์ทั่วไป เมื่อเลือกตัวเลือกนี้ Inverse Aperture Correction จะปรับปรุงกราฟฟิคของตัวกรองการสั่น และโหมดของข้อความบน DOS


Aperture Correction :  Aperture Correction จะเพิ่มรายละเอียดของภาพเมื่อตัวกรองการสั่นถูกใช้งาน


ตัวเลื่อน Aperture Correction : เพิ่มหรือลดค่า Aperture Correction  ที่ระบบใช้ ตั้งแต่กำหนดให้ค่าการเพิ่มรายละเอียดของภาพมากขึ้นไปจนถึงค่าที่น้อยลง


Aperture Correction Low Threshold: ถ้าค่า Aperture correction น้อยกว่าค่า Threshold นี้ค่าของ Aperture Correction จะลบออกจากค่าความสว่าง ในกรณีที่เป็น Inverse Aperture Correction เครื่องหมายของ Aperture Correction จะเป็นลบ


ตัวเลื่อน Aperture Correction Low Threshold: เพิ่มหรือลดค่าของ Aperture Correction Low Threshold


Aperture Correction Middle Threshold: ถ้าค่า Aperture correction อยู่ระหว่างค่า Low Threshold และ Middle Threshold  ค่าของ Aperture Correction จะนำไปบวกกับค่าความสว่าง ถ้าค่า Aperture correction อยู่ระหว่างค่า Middle Threshold และ High Threshold  ค่าของ Aperture Correction จะนำไปลบจากค่าความสว่าง ในกรณีที่เป็น Inverse Aperture Correction เครื่องหมายของ Aperture Correction จะเป็นลบ


ตัวเลื่อน Aperture Correction Middle Threshold: เพิ่มหรือลดค่าของ Aperture Correction Middle Threshold


Aperture Correction High Threshold: ถ้าค่า Aperture correction มากกว่าค่า Threshold นี้ ค่าของ Aperture Correction จะบวกเพิ่มเข้ากับค่าความสว่าง ในกรณีที่เป็น Inverse Aperture Correction เครื่องหมายของ Aperture Correction จะกลับกัน


ตัวเลื่อน Aperture Correction High Threshold: เพิ่มหรือลดค่าของ Aperture Correction High Threshold


ปุ่มกำหนดค่าไว้ใช้หลัก: คลิกเพื่อกำหนด Aperture Correction, Aperture Correction Low Threshold, Aperture Correction Middle Threshold  และ Aperture Correction High Threshold ให้เป็นไปตามค่าเริ่มต้นที่เก็บบน BIOS


ข้อมูลการ์ดกราฟฟิค:  แสดงชนิดของชิพ ขนาดหน่วยความจำของภาพ (เมกกะไบต์) และรุ่นของ BIOS


ข้อมูลของไดรเวอร์: แสดงหมายเลขรุ่นของไดรเวอร์และวันที่นำออกสู่ท้องตลาด


ข้อมูลไดรเวอร์ของจอภาพ: แสดงหมายเลขรุ่นไดรเวอร์ของจอภาพและวันที่นำออกสู่ท้องตลาด


ข้อมูลไดรเวอร์ VPM: แสดงหมายเลขรุ่นไดรเวอร์ VPM และวันที่นำออกสู่ท้องตลาด


ข้อมูลของโปรแกรม: แสดงหมายเลขรุ่นของโปรแกรม


DFP:  เลือกเพื่อแสดงผลบน DFP


CRT 2: เลือกเพื่อแสดงผลบนจอ CRT ที่ 2


บิทแมพของ LCD: แสดงสถานะของ LCD ถ้าหากไม่มี LCD บิทแมพของ LCD จะแสดงเป็นจอว่าง ถ้ามี LCD อยู่แต่ไม่ได้เลือกใช้งาน บิทแมพของ LCD จะแสดงเป็นจอว่าง ถ้ามี LCD อยู่และเลือกใช้งาน จะแสดงเป็นภาพของเดสค์ทอป


บิทแมพของ DFP: แสดงสถานะของแผ่นราบแบบดิจิตอล(digital flat panel) ถ้าไม่ได้ต่อ DFP ไว้ บิทแมพของ DFP จะแสดงเป็นจอว่าง ถ้าต่อ DFP ไว้แต่ไม่ได้เลือกใช้งาน บิทแมพของ DFP จะแสดงเป็นจอว่าง ถ้าต่อ DFP ไว้และเลือกใช้งาน จะแสดงเป็นภาพของเดสค์ทอป


บิทแมพของ CRT2: แสดงสถานะของ CRT ที่สอง ถ้าต่อจอ CRT ที่สองไว้ บิทแมพของ CRT จะแสดงเป็นจอว่าง ถ้าต่อจอ CRT ที่สองไว้แต่ไม่เลือกใช้งาน บิทแมพของจอ CRT จะแสดงเป็นจอว่าง ถ้าต่อจอ CRT ที่สองไว้และเลือกใช้งาน จะแสดงเป็นภาพของเดสค์ทอป


ค่าที่กำหนดของจอ CRT:  คลิกเพื่อดูค่าที่กำหนดไว้สำหรับจอ CRT


ค่าที่กำหนดของจอ LCD: คลิกเพื่อดูค่าที่กำหนดไว้สำหรับจอ LCD


ค่าที่กำหนดของ DFP: คลิกเพื่อดูค่าที่กำหนดไว้สำหรับ  DFP


ค่าที่กำหนดของโทรทัศน์: คลิกเพื่อดูค่าที่กำหนดไว้สำหรับโทรทัศน์


ค่าที่กำหนดของจอ CRT 2: คลิกเพื่อดูค่าที่กำหนดไว้สำหรับจอ CRT ที่สอง


คลิกเพื่อเปิดเวปเพจสำหรับผลิตภัณฑ์นี้


ข้อมูล:  คลิกเพื่อแสดงหน้าจอข้อมูล ซึ่งบอกถึงวันที่และรุ่นของ BIOS และไดรเวอร์ของจอแสดงผล รวมถึงหมายเลขรุ่นของโปรแกรมนี้


ปุ่มปรับโทรทัศน์: ใช้สำหรับเปิดหน้าสำหรับปรับขนาด  และตำแหน่งของภาพบนโทรทัศน์


ข้อมูลของโปรแกรม: แสดงหมายเลขรุ่นของโปรแกรมนี้และชื่อของไฟล์ทรัพยากร(resource file)ที่ใช้ (ถ้ามี)


แสดงผลแบบที่ 1: เลือกใช้ค่าที่กำหนดการแสดงผลแบบที่ 1 #


แสดงผลแบบที่ 2: เลือกใช้ค่าที่กำหนดการแสดงผลแบบที่ 2 #